/*
 Navicat Premium Data Transfer

 Source Server         : 2112B
 Source Server Type    : MySQL
 Source Server Version : 50557
 Source Host           : localhost:3306
 Source Schema         : 2112-zgl-dya08-rk

 Target Server Type    : MySQL
 Target Server Version : 50557
 File Encoding         : 65001

 Date: 26/07/2024 08:59:36
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for t_bill
-- ----------------------------
DROP TABLE IF EXISTS `t_bill`;
CREATE TABLE `t_bill`  (
  `bill_id` int(11) NOT NULL AUTO_INCREMENT,
  `bill_date` datetime NULL DEFAULT NULL,
  `bill_monery` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`bill_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Compact;

-- ----------------------------
-- Records of t_bill
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
