/*
 Navicat Premium Data Transfer

 Source Server         : 2112B
 Source Server Type    : MySQL
 Source Server Version : 50557
 Source Host           : localhost:3306
 Source Schema         : day_6

 Target Server Type    : MySQL
 Target Server Version : 50557
 File Encoding         : 65001

 Date: 26/07/2024 09:34:20
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for bill
-- ----------------------------
DROP TABLE IF EXISTS `bill`;
CREATE TABLE `bill`  (
  `bill_id` int(11) NOT NULL AUTO_INCREMENT,
  `bill_date` datetime NULL DEFAULT NULL,
  `bill_monery` double NULL DEFAULT NULL,
  PRIMARY KEY (`bill_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 6 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Compact;

-- ----------------------------
-- Records of bill
-- ----------------------------
INSERT INTO `bill` VALUES (1, '2002-10-21 00:00:00', 998);
INSERT INTO `bill` VALUES (2, '2202-01-01 00:00:00', 70.9);
INSERT INTO `bill` VALUES (3, '2024-07-26 09:10:03', 99.9);
INSERT INTO `bill` VALUES (4, '2024-07-26 09:12:41', 21321);
INSERT INTO `bill` VALUES (5, '2024-07-26 09:15:06', 434);

SET FOREIGN_KEY_CHECKS = 1;
